d101fms_geo.fit - GI1_047054_UGC06900_0001

400 500

400

500

600

0 0 0 0 0 0

z1=-0.00 z2=0.00 ztrans=linear Con=-0.80 Brt=0.61 cmap=Grayscale ncolors=204

NOAO/IRAF dah@rana.lowell.edu Fri Jan 29 07:57:56 2010