(25228) Mikekitt = 1998 TR_{30} Discovered 1998 Oct 31 by the Lowell Observatory Near-Earth Object Search at the Anderson Mesa Station Michael Kitt (b. 1941) is an amateur astronomer who has written numerous articles about lunar observing and is author of The Moon: an Observing Guide for Backyard Telescopes. He is a long-standing Lowell Observatory Advisory Board member and a supporter of preservation activities there.

Semimajor axis 2.99 AU Eccentricity 0.027 Inclination 5.35 deg Diameter 4–5 km