GA 0720:32408485 by 2012HZ84 2024/10/21 09:10:44

RA: 19 44 02.87738 DEC: -17 47 55.6892 Ephemeris corrections: 0.0000s 0.000as Asteroid V: 16.17 Computed R: 15.77 Star G: 16.21 Drop in G: 0.400 Diam: 80.0 = 0.003as Max Duration: 10.8s Q: 71.2 Solar elongation: 86.6 Lunar elongation: 146.0 Illuminated: 79.6% Sun altitude at -12.0 shown dotted Ticks from: 09:00:00 to 09:20:00 every 2 min