

\begin{deluxetable}{l c c c c c c}
\pagestyle{empty}
\tabletypesize{\scriptsize}
\tablewidth{0pc}
\tablenum{2}
\tablecolumns{7}
\tablecaption{\label{tab:obs}Observation Parameters}
\tablehead{
\colhead{}
&\multicolumn{2}{c}{KPNO}
&\colhead{}
&\multicolumn{3}{c}{CTIO} \\ \cline{2-3} \cline{5-7}
\multicolumn{1}{l}{}
&\colhead{BLUE}
&\colhead{RED}
&\colhead{}
&\colhead{BLUE}
&\colhead{ORANGE}
&\colhead{RED}
}
\startdata
Grating/Order  &26/I  &58/I  & &26/I &58/I &58/I \\
Blocking Dilter &none &GG495 & &none &GG495 &OG570 \\
Wavelength Coverage(\AA\ ) &3200 - 6000 &5000 - 9000 & &3500 -5200 &5000 - 7500 &6300 - 9000 \\
Slit Width(``/$\mu$)  &2.1''/170 $\mu$m &3.0''/250 $\mu$m & &4.9''/270 $\mu$m &3.6''/200 $\mu$m &3.6''/200 $\mu$m \\
Dispersion(\AA\ /mm) &1.3 &1.9 & &1.5 & 2.2 &2.2 \\
Resolution(\AA\ ) &3.6 &5.7 & &5.0 &6.4 &6.4 \\
\enddata
\end{deluxetable}

